diff --git a/openecomp-ui/src/sdc-app/heatValidation.app.jsx b/openecomp-ui/src/sdc-app/heatValidation.app.jsx
index 6ff3c73..5abe309 100644
--- a/openecomp-ui/src/sdc-app/heatValidation.app.jsx
+++ b/openecomp-ui/src/sdc-app/heatValidation.app.jsx
@@ -24,4 +24,4 @@
 import Application from './Application.jsx';
 
 
-ReactDOM.render(<Application><UploadScreen/></Application>, document.getElementById('heat-validation-app'));
+ReactDOM.render(<Application openSocket={false}><UploadScreen/></Application>, document.getElementById('heat-validation-app'));
