diff --git a/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx b/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx
index ca24964..8e7c87d 100644
--- a/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx
+++ b/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx
@@ -15,7 +15,7 @@
  */
 import React, { Component } from 'react';
 import PropTypes from 'prop-types';
-import Button from 'sdc-ui/lib/react/Button.js';
+import { Button } from 'onap-ui-react';
 import Sequencer from 'dox-sequence-diagram-ui';
 
 import i18n from 'nfvo-utils/i18n/i18n.js';
