diff --git a/asdc-controller/src/test/resources/schema.sql b/asdc-controller/src/test/resources/schema.sql
index d138d9e..ed6cb89 100644
--- a/asdc-controller/src/test/resources/schema.sql
+++ b/asdc-controller/src/test/resources/schema.sql
@@ -809,6 +809,10 @@
   `OVERALL_DISTRIBUTION_STATUS` varchar(45),
   `ONAP_GENERATED_NAMING` TINYINT(1) DEFAULT NULL,
   `NAMING_POLICY` varchar(200) DEFAULT NULL,
+  `CDS_BLUEPRINT_NAME` varchar(200) DEFAULT NULL,
+  `CDS_BLUEPRINT_VERSION` varchar(20) DEFAULT NULL,
+  `CONTROLLER_ACTOR` varchar(200) DEFAULT NULL,
+  `SKIP_POST_INSTANTIATION_CONFIGURATION` boolean default true,
   PRIMARY KEY (`MODEL_UUID`),
   KEY `fk_service__tosca_csar1_idx` (`TOSCA_CSAR_ARTIFACT_UUID`),
   CONSTRAINT `fk_service__tosca_csar1` FOREIGN KEY (`TOSCA_CSAR_ARTIFACT_UUID`) REFERENCES `tosca_csar` (`ARTIFACT_UUID`) ON DELETE CASCADE ON UPDATE CASCADE
@@ -963,6 +967,7 @@
   `CREATION_TIMESTAMP` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
   `VF_MODULE_MODEL_UUID` varchar(200) NOT NULL,
   `VNF_RESOURCE_CUSTOMIZATION_ID` int(13) DEFAULT NULL,
+  `SKIP_POST_INSTANTIATION_CONFIGURATION` boolean default true,
   PRIMARY KEY (`ID`),
   KEY `fk_vf_module_customization__vf_module1_idx` (`VF_MODULE_MODEL_UUID`),
   KEY `fk_vf_module_customization__heat_env__heat_environment1_idx` (`HEAT_ENVIRONMENT_ARTIFACT_UUID`),
@@ -1113,7 +1118,8 @@
   `VNF_RESOURCE_MODEL_UUID` varchar(200) NOT NULL,
   `SERVICE_MODEL_UUID` varchar(200) NOT NULL,
   `VNFCINSTANCEGROUP_ORDER` varchar(200) default NULL,
-  `NF_DATA_VALID` tinyint(1) DEFAULT '0',  
+  `NF_DATA_VALID` tinyint(1) DEFAULT '0',
+  `CONTROLLER_ACTOR` varchar(200) DEFAULT NULL,
   PRIMARY KEY (`ID`),
   UNIQUE KEY `UK_vnf_resource_customization` (`MODEL_CUSTOMIZATION_UUID`,`SERVICE_MODEL_UUID`),
   KEY `fk_vnf_resource_customization__vnf_resource1_idx` (`VNF_RESOURCE_MODEL_UUID`),
@@ -1195,6 +1201,7 @@
   `CDS_BLUEPRINT_NAME` varchar(200) DEFAULT NULL,
   `CDS_BLUEPRINT_VERSION` varchar(20) DEFAULT NULL,
   `SKIP_POST_INSTANTIATION_CONFIGURATION` boolean default true,
+  `CONTROLLER_ACTOR` varchar(200) DEFAULT NULL,
   PRIMARY KEY (`MODEL_CUSTOMIZATION_UUID`),
   KEY `fk_pnf_resource_customization__pnf_resource1_idx` (`PNF_RESOURCE_MODEL_UUID`),
   CONSTRAINT `fk_pnf_resource_customization__pnf_resource1` FOREIGN KEY (`PNF_RESOURCE_MODEL_UUID`) REFERENCES `pnf_resource` (`MODEL_UUID`) ON DELETE CASCADE ON UPDATE CASCADE
