diff --git a/asdc-controller/src/test/resources/schema.sql b/asdc-controller/src/test/resources/schema.sql
index 0372887..a84b02d 100644
--- a/asdc-controller/src/test/resources/schema.sql
+++ b/asdc-controller/src/test/resources/schema.sql
@@ -935,6 +935,7 @@
   `CONFIGURATION_NAME` varchar(200) DEFAULT NULL,
   `OPERATIONAL_ENV_ID` varchar(45) DEFAULT NULL,
   `OPERATIONAL_ENV_NAME` varchar(200) DEFAULT NULL,
+  `REQUEST_URL` varchar(500) DEFAULT NULL,  
   PRIMARY KEY (`REQUEST_ID`),
   UNIQUE KEY `UK_bhu6w8p7wvur4pin0gjw2d5ak` (`CLIENT_REQUEST_ID`)
 ) ENGINE=InnoDB DEFAULT CHARSET=latin1;
@@ -984,6 +985,7 @@
   `CONFIGURATION_NAME` varchar(200) DEFAULT NULL,
   `OPERATIONAL_ENV_ID` varchar(45) DEFAULT NULL,
   `OPERATIONAL_ENV_NAME` varchar(200) DEFAULT NULL,
+  `REQUEST_URL` varchar(500) DEFAULT NULL,  
   PRIMARY KEY (`REQUEST_ID`),
   UNIQUE KEY `UK_bhu6w8p7wvur4pin0gjw2d72h` (`CLIENT_REQUEST_ID`)
 ) ENGINE=InnoDB DEFAULT CHARSET=latin1;
