diff --git a/asdc-controller/src/test/resources/schema.sql b/asdc-controller/src/test/resources/schema.sql
index a50b275..d143b52 100644
--- a/asdc-controller/src/test/resources/schema.sql
+++ b/asdc-controller/src/test/resources/schema.sql
@@ -1136,6 +1136,7 @@
   `MODEL_NAME` varchar(200) NOT NULL,
   `TOSCA_NODE_TYPE` varchar(200) NOT NULL,
   `DESCRIPTION` varchar(1200) DEFAULT NULL,
+  `RESOURCE_INPUT` varchar(20000) DEFAULT NULL,
   `CREATION_TIMESTAMP` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
   PRIMARY KEY (`MODEL_CUSTOMIZATION_UUID`)
 ) ENGINE=InnoDB DEFAULT CHARSET=latin1;
